-- phpMyAdmin SQL Dump
-- version 4.7.9
-- https://www.phpmyadmin.net/
--
-- Hôte : 127.0.0.1:3306
-- Généré le :  jeu. 31 mai 2018 à 09:01
-- Version du serveur :  5.7.21
-- Version de PHP :  5.6.35

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET AUTOCOMMIT = 0;
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Base de données :  `captbdd`
--

-- --------------------------------------------------------

--
-- Structure de la table `capteurs`
--

DROP TABLE IF EXISTS `capteurs`;
CREATE TABLE IF NOT EXISTS `capteurs` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `lux` float NOT NULL,
  `vent` float NOT NULL,
  `A/M` tinyint(1) NOT NULL,
  `eInt` tinyint(1) NOT NULL,
  `eExt` tinyint(1) NOT NULL,
  `Store` tinyint(1) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=13 DEFAULT CHARSET=utf8;

--
-- Déchargement des données de la table `capteurs`
--

INSERT INTO `capteurs` (`id`, `lux`, `vent`, `A/M`, `eInt`, `eExt`, `Store`) VALUES
(1, 4321, 2, 0, 0, 0, 0);
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
